0 5 10 15 20

[Na+]i (mM)

A

80 90 100 110 120

[K+]i (mM)

B

0 5 10 15 20

[Cl-]i (mM)

C

8 9 10 11 12

[HCO 3-]i (mM)

D

120 130 140 150 160

[Na+]o (mM)

E

130 135 140 145 150

[Cl-]o (mM)

F

0 20 40 60 0 10 20 30 40

Time (s)

3-]o (mM)

G

0 20 40 60

-100

-80

-60

-40

Time (s)

Vm (mV)

H

0 20 40 60 280 290 300 310 320

Time (s)

Πo (mM)

I