0 5 10 15 20 25 30 35 40 0

0.05

0.1

0.15

0.2

0.25

0.3

0.35

macrostates stationary distribution π

0 20 40

0 20 40 0 0.2 0.4 0.6 0.8 1

state state

Probability

0 20 40

0 20 40 0 0.1 0.2 0.3 0.4

state state

Probability at step n

Convergence Error at N= 1658 delta = 9.8845e-15