Figure S2. Steady-state response of the RS-LTS network with RS-to-RS synaptic connections to constant inputs to the RS neurons.

Additional parameters are g_{RL} = 35, g_{LR} = 7.5. Solid lines denote stable states, and dashed lines denote unstable states.

(A) M_R-I_R curves (top panel) and M_L-I_R curves (bottom panel) are plotted for g_{RR} = 0 (black), 20 (red), 40 (green) and 60 (blue). Additional parameter is τ_{r,RR} = 463 ms. The values of M_{R,c} for g_{RR} = 40 and 60 are denoted by solid circles.

(B) M_R-I_R curves are plotted for τ_{r,RR} = 0 (black), 60 ms (red), 200 ms (green), 463 ms (blue) and 1000 ms (yellow). Additional parameter is g_{RR} = 40.