Figure S3. Response of the RS-LTS network with RS-to-RS synaptic connections to step inputs I_RΘ(t) to the RS neurons.

Time courses of M_R (top panel) and M_L (bottom panel) are shown. Additional parameters are g_{RL} = 35, g_{LR} = 7.5, g_{RR} = 40. Graphs on the right side present the same curves during the onset of activity with a shorter time scale.