0 0.2 0.4 0.6 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

Robustness of initial genotype

Robustness of final genotype

(A)

0 0.2 0.4 0.6 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

Robustness of initial genotype 0 0.2 0.4 0.6 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

Robustness of initial genotype 0 0.2 0.4 0.6 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

0

(B)

0

(C)