voltage (mV) time (ms) (a) 0 50 100 150 200 0 5 10 15 20

time (ms) (b) 0 50 100 150 200 0

5

10

15

time (ms) (c) 0 50 100 150 200 0

5

10

15

20

0 0.2 0.4 0.6 0.8 1

0 50 100 150 200 0 5 10 15 20

time (ms) (d)

Firing rate (Hz)

Sim DiPDE FP 0 5 10 15 20 0 0.02

0.04

0.06

0.08 0.1

voltage (mV) (e)

Prob density (mV -1)

Sim DiPDE FP