Inter-area axonal delay [ms]

Frequency [Hz]

0 5 10 15 20 25 30 10 20 30 40 50 60 70 80 90

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

Inter-area axonal delay [ms]

0 5 10 15 20 25 30 10 20 30 40 50 60 70 80 90

5

10

15

20 A B

0 0